From 797ddead2ae5f678eee182993023f524f8536d9f Mon Sep 17 00:00:00 2001
From: mistic100 <mistic@piwigo.org>
Date: Fri, 8 Apr 2011 09:09:13 +0000
Subject: bug:1791 display hd dimensions instead of websize dimensions

git-svn-id: http://piwigo.org/svn/trunk@10157 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/piwigo_structure-pdo-sqlite.sql | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'install/piwigo_structure-pdo-sqlite.sql')

diff --git a/install/piwigo_structure-pdo-sqlite.sql b/install/piwigo_structure-pdo-sqlite.sql
index a46c5929d..f89fd160f 100644
--- a/install/piwigo_structure-pdo-sqlite.sql
+++ b/install/piwigo_structure-pdo-sqlite.sql
@@ -188,6 +188,8 @@ CREATE TABLE piwigo_images
   "path" VARCHAR(255) default '' NOT NULL,
   "storage_category_id" INTEGER,
   "high_filesize" INTEGER,
+  "high_width" INTEGER,
+  "high_height" INTEGER,
   "level" INTEGER default 0 NOT NULL,
   "md5sum" CHAR(32),
   "added_by" INTEGER default 0 NOT NULL,
-- 
cgit v1.2.3

