From 5d06d4354144066a39bca1c28b7a326b2de5283c Mon Sep 17 00:00:00 2001
From: nikrou <nikrou@piwigo.org>
Date: Sun, 23 Jul 2006 15:25:49 +0000
Subject: bug 451 fixed: problem with auto login - add an auto_login_key in
 users_table - $conf['session_length'] is no more useful     and sessions
 length will be 0 (until browser closed) - add $conf['remember_me_name'] for
 cookie remember name

git-svn-id: http://piwigo.org/svn/trunk@1493 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/phpwebgallery_structure.sql | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'install/phpwebgallery_structure.sql')

diff --git a/install/phpwebgallery_structure.sql b/install/phpwebgallery_structure.sql
index 73f132af7..5a3b13014 100644
--- a/install/phpwebgallery_structure.sql
+++ b/install/phpwebgallery_structure.sql
@@ -1,4 +1,4 @@
--- MySQL dump 9.11
+1-- MySQL dump 9.11
 --
 -- Host: localhost    Database: pwg-bsf
 -- ------------------------------------------------------
@@ -345,6 +345,7 @@ CREATE TABLE `phpwebgallery_users` (
   `username` varchar(20) binary NOT NULL default '',
   `password` varchar(32) default NULL,
   `mail_address` varchar(255) default NULL,
+  `auto_login_key` varchar(64) default NULL,
   PRIMARY KEY  (`id`),
   UNIQUE KEY `users_ui1` (`username`)
 ) TYPE=MyISAM;
-- 
cgit v1.2.3

