From 1f53608976250806d9a37f93e386f53a84aedbbc Mon Sep 17 00:00:00 2001
From: vdigital <vdigital@piwigo.org>
Date: Thu, 8 Feb 2007 21:20:40 +0000
Subject: Web Service: - Delete high and normal in #ws_access table - start
 date is kept.

w0p0 template: Minor change


git-svn-id: http://piwigo.org/svn/trunk@1791 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/phpwebgallery_structure.sql | 2 --
 1 file changed, 2 deletions(-)

(limited to 'install/phpwebgallery_structure.sql')

diff --git a/install/phpwebgallery_structure.sql b/install/phpwebgallery_structure.sql
index 9e9ecb76a..52c671eba 100644
--- a/install/phpwebgallery_structure.sql
+++ b/install/phpwebgallery_structure.sql
@@ -431,8 +431,6 @@ CREATE TABLE `phpwebgallery_ws_access` (
   `start` datetime default NULL,
   `end` datetime default NULL,
   `request` varchar(255) default NULL,
-  `high` enum('true','false') NOT NULL default 'true',
-  `normal` enum('true','false') NOT NULL default 'true',
   `limit` smallint(5) unsigned default NULL,
   `comment` varchar(255) default NULL,
   PRIMARY KEY  (`id`),
-- 
cgit v1.2.3

