From 1150fb7add4ecd9285ae2fd5b463e78680237f7d Mon Sep 17 00:00:00 2001
From: nikrou <nikrou@piwigo.org>
Date: Tue, 25 Jul 2006 07:40:02 +0000
Subject: fix bug 486: field username too small

git-svn-id: http://piwigo.org/svn/trunk@1495 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/phpwebgallery_structure.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'install/phpwebgallery_structure.sql')

diff --git a/install/phpwebgallery_structure.sql b/install/phpwebgallery_structure.sql
index 5a3b13014..b9434ff09 100644
--- a/install/phpwebgallery_structure.sql
+++ b/install/phpwebgallery_structure.sql
@@ -342,7 +342,7 @@ CREATE TABLE `phpwebgallery_user_mail_notification` (
 DROP TABLE IF EXISTS `phpwebgallery_users`;
 CREATE TABLE `phpwebgallery_users` (
   `id` smallint(5) NOT NULL auto_increment,
-  `username` varchar(20) binary NOT NULL default '',
+  `username` varchar(100) binary NOT NULL default '',
   `password` varchar(32) default NULL,
   `mail_address` varchar(255) default NULL,
   `auto_login_key` varchar(64) default NULL,
-- 
cgit v1.2.3

