From c614c0798e96109170d2382121e897cc5b80cb06 Mon Sep 17 00:00:00 2001
From: plegall <plg@piwigo.org>
Date: Sat, 3 Sep 2005 20:56:35 +0000
Subject: (not in ChangeLog)

- yoga template used for installation and by default in user_infos table

- adaptation of yoga template to itself (no use of icons from template
  default)


git-svn-id: http://piwigo.org/svn/trunk@860 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/config.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'install/config.sql')

diff --git a/install/config.sql b/install/config.sql
index fa27ce1e3..41d109dae 100644
--- a/install/config.sql
+++ b/install/config.sql
@@ -1,7 +1,7 @@
 -- initial configuration for PhpWebGallery
 
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_language','en_UK.iso-8859-1','Default gallery language');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_template','default','Default gallery style');
+INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_template','yoga','Default gallery style');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_maxwidth','','maximum width authorized for displaying images');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_maxheight','','maximum height authorized for the displaying images');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_comment_page','10','number of comments to display on each page');
-- 
cgit v1.2.3

