From 7eae7595909a49d4355453c73638151097a53f20 Mon Sep 17 00:00:00 2001
From: plegall <plg@piwigo.org>
Date: Sat, 3 Sep 2005 16:36:05 +0000
Subject: - modification : less configuration parameters in administration  
 screen. These parameters are move to include/config_default.inc.php.

- new : ability to add a single picture to caddie from picture.php

- new : contextual help, only a few pages are available.

- new : ability to delete users from admin/user_list

- modification : reorganization of configuration file

- new : configuration parameter use_exif_mapping

- improvement : MOD hidemail added to standard


git-svn-id: http://piwigo.org/svn/trunk@858 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/config.sql | 7 -------
 1 file changed, 7 deletions(-)

(limited to 'install/config.sql')

diff --git a/install/config.sql b/install/config.sql
index ba7e8875d..fa27ce1e3 100644
--- a/install/config.sql
+++ b/install/config.sql
@@ -1,17 +1,10 @@
 -- initial configuration for PhpWebGallery
 
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('prefix_thumbnail','TN-','thumbnails filename prefix');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('mail_webmaster','','webmaster mail');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_language','en_UK.iso-8859-1','Default gallery language');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_template','default','Default gallery style');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_maxwidth','','maximum width authorized for displaying images');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_maxheight','','maximum height authorized for the displaying images');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_comment_page','10','number of comments to display on each page');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('upload_maxfilesize','150','maximum filesize for the uploaded pictures');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('upload_maxwidth','800','maximum width authorized for the uploaded images');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('upload_maxheight','600','maximum height authorized for the uploaded images');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('upload_maxwidth_thumbnail','150','maximum width authorized for the uploaded thumbnails');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('upload_maxheight_thumbnail','100','maximum height authorized for the uploaded thumbnails');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('log','false','keep an history of visits on your website');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('comments_validation','false','administrators validate users comments before becoming visible');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('comments_forall','false','even guest not registered can post comments');
-- 
cgit v1.2.3

