From 7c43a3c62d28162ee70e960f51e048727725cb31 Mon Sep 17 00:00:00 2001
From: rub <rub@piwigo.org>
Date: Wed, 28 Mar 2007 19:57:00 +0000
Subject: Issue 578 User guest must be real user

Step 1: guest is a real user

On next commit, I finish installation and use of guest of user list and group

git-svn-id: http://piwigo.org/svn/trunk@1926 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/config.sql | 10 ----------
 1 file changed, 10 deletions(-)

(limited to 'install/config.sql')

diff --git a/install/config.sql b/install/config.sql
index 1669502bb..eea554e22 100644
--- a/install/config.sql
+++ b/install/config.sql
@@ -1,19 +1,9 @@
 -- initial configuration for PhpWebGallery
 
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_language','en_UK.iso-8859-1','Default gallery language');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_template','yoga/clear','Default gallery style');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_maxwidth','','maximum width authorized for displaying images');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_maxheight','','maximum height authorized for the displaying images');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_comment_page','10','number of comments to display on each page');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('log','false','keep an history of visits on your website');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('comments_validation','false','administrators validate users comments before becoming visible');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('comments_forall','false','even guest not registered can post comments');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_image_line','5','Number of images displayed per row');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_line_page','3','Number of rows displayed per page');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('recent_period','7','Period within which pictures are displayed as new (in days)');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('auto_expand','false','Auto expand of the category tree');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('show_nb_comments','false','Show the number of comments under the thumbnails');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('show_nb_hits', 'false', 'Show hits count under thumbnails');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('gallery_locked','false','Lock your gallery temporary for non admin users');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('gallery_title','PhpWebGallery demonstration site','Title at top of each page and for RSS feed');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('gallery_url','http://demo.phpwebgallery.net','URL given in RSS feed');
-- 
cgit v1.2.3

