From 429dd2ff626119727103297cd33b3c9a3b921d89 Mon Sep 17 00:00:00 2001
From: plegall <plg@piwigo.org>
Date: Wed, 24 Aug 2005 22:22:29 +0000
Subject: - deletion : no mail notification anymore. Feature replaced by RSS
 feed   notification.

- improvement : on waiting pictures management. Ability to validate all or
  reject all in one clic.

- regrouped fields in admin/update


git-svn-id: http://piwigo.org/svn/trunk@849 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/config.sql | 1 -
 1 file changed, 1 deletion(-)

(limited to 'install/config.sql')

diff --git a/install/config.sql b/install/config.sql
index 910e51388..ba7e8875d 100644
--- a/install/config.sql
+++ b/install/config.sql
@@ -15,7 +15,6 @@ INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('upload_maxheight
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('log','false','keep an history of visits on your website');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('comments_validation','false','administrators validate users comments before becoming visible');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('comments_forall','false','even guest not registered can post comments');
-INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('mail_notification','false','automated mail notification for adminsitrators');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_image_line','5','Number of images displayed per row');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_line_page','3','Number of rows displayed per page');
 INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('recent_period','7','Period within which pictures are displayed as new (in days)');
-- 
cgit v1.2.3

