##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
events_bugs              : BUG#17619 2006-02-21 andrey  Test case unstable (race conditions)
events_stress            : BUG#17619 2006-02-21 andrey  Test case unstable
events                   : BUG#17619 2006-02-21 andrey  Test case unstable
events_logs_tests        : BUG#18953 2006-04-12 kent    Test is randomly failing
ndb_autodiscover         : BUG#18952 2006-02-16 jmiller Needs to be fixed w.r.t binlog
ndb_autodiscover2        : BUG#18952 2006-02-16 jmiller Needs to be fixed w.r.t binlog
ndb_binlog_ddl_multi     : BUG#18976 2006-04-10 kent    Test fails randomly
ndb_cache2               : BUG#18597 2006-03-28 brian
ndb_cache_multi2         : BUG#18974 2006-04-10 kent    Test fails randomly
ndb_gis                  : BUG#18600 2006-03-28 brian
ndb_load                 : BUG#17233 2006-02-16 jmiller
partition_03ndb          : BUG#16385 2006-03-24 mikael
ps_7ndb                  : BUG#18950 2006-02-16 jmiller Dbug assert in RBR mode when executing test suite
rpl_ndb_dd_basic         : BUG#18569 2006-03-28 brian
rpl_row_basic_7ndb       : BUG#18923 2006-04-09 brian
rpl_ndb_dd_advance       : BUG#18924 2006-04-09 brian
rpl_ndb_multi_update2    : BUG#18928 2006-04-09 brian
rpl_ndb_2innodb          : BUG#18945 2006-03-22 tomas   Assertion in get_parts_for_update()
rpl_ndb_2myisam          : BUG#18945 2006-03-22 tomas   Assertion in get_parts_for_update()
rpl_ndb_auto_inc         : BUG#17086 2006-02-16 jmiller
rpl_ndb_basic            : BUG#18592 2006-03-28 brian
rpl_ndb_ddl              : BUG#18946 2006-03-16 mats    Master hangs (Probably related to BUG#17400)
rpl_ndb_insert_ignore    : BUG#18567 2006-03-28 brian
rpl_ndb_innodb2ndb       : BUG#18261 2006-03-16 mats    Cluster Replication: tests rpl_ndb_xxx2ndb fails (BUG#17400)
rpl_ndb_myisam2ndb       : BUG#18261 2006-03-16 mats    Cluster Replication: tests rpl_ndb_xxx2ndb fails (BUG#17400)
rpl_ndb_multi_update3    : BUG#18627 2006-03-29 monty   Cluster Replication: rpl_ndb_multi_update3 fails on Intel 64 bit
rpl_ndb_log              : BUG#18947 2006-03-21 tomas   Result not deterministic, TBD if should remove
rpl_ndb_relay_space      : BUG#16993 2006-02-16 jmiller
rpl_ndb_trig004          : BUG#18977 2006-04-10 kent    Test fails randomly
rpl_switch_stm_row_mixed : BUG#18590 2006-03-28 brian
rpl_row_blob_innodb      : BUG#18980 2006-04-10 kent    Test fails randomly
rpl_row_inexist_tbl      : BUG#18948 2006-03-09 mats    Disabled since patch makes this test wait forever
rpl_sp                   : BUG#16456 2006-02-16 jmiller
rpl_until                : BUG#15886 2006-02-16 jmiller Unstable test case
sp-goto                  : BUG#18949 2006-02-16 jmiller GOTO is currently is disabled - will be fixed in the future
mysqldump                : BUG#18078 2006-03-10 lars
udf                      : BUG#18564 2006-03-27 ian     (Permission by Brian)

#ndb_alter_table_row      : sometimes wrong error 1015!=1046
#ndb_binlog_basic         : Results are not deterministic, Tomas will fix
#ndb_binlog_multi         : Results are not deterministic, Tomas will fix
#rpl_bit_npk              : Bug#13418
#rpl_ddl                  : Bug#15963 SBR does not show "Definer" correctly
#rpl_ndb_blob             : interferes with following tests, causing hang
#rpl_ndb_blob2            : interferes with following tests, causing hang
#rpl_ndb_delete_nowhere   : Bug#17400: delete & update of rows in table without pk fails
#rpl_ndb_multi_update3    : Bug#17400: delete & update of rows in table without pk fails
