<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;"># Copyright (C) 2009 Sun Microsystems, Inc
#
# This program is free software; you can redistribute it and/or modify
# it under the terms of the GNU General Public License as published by
# the Free Software Foundation; version 2 of the License.
#
# This program is distributed in the hope that it will be useful,
# but WITHOUT ANY WARRANTY; without even the implied warranty of
# MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
# GNU General Public License for more details.
#
# You should have received a copy of the GNU General Public License
# along with this program; if not, write to the Free Software
# Foundation, Inc., 59 Temple Place, Suite 330, Boston, MA 02111-1307 USA

##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    &lt;testcasename&gt; : BUG#&lt;xxxx&gt; &lt;date disabled&gt; &lt;disabler&gt; &lt;comment&gt;
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

</pre></body></html>