##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

rpl_get_master_version_and_clock:  # Bug#46931 2009-10-17 joro rpl.rpl_get_master_version_and_clock fails
rpl_row_create_table            : Bug#45576 2009-12-01 joro rpl_row_create_table fails on PB2
rpl_row_create_table : Bug#51574 Feb 27 2010 andrei failed different way than earlier with bug#45576
rpl_spec_variables		: BUG#47661 2009-10-27 jasonh rpl_spec_variables fails on PB2 hpux
