<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    &lt;testcasename&gt; : BUG#&lt;xxxx&gt; &lt;date disabled&gt; &lt;disabler&gt; &lt;comment&gt;
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
kill                     : Bug#37780 2008-12-03 HHunger need some changes to be robust enough for pushbuild.
innodb_bug39438          : Bug#42383 2009-01-28 lsoares "This fails in embedded and on windows.  Note that this test is not run on windows and on embedded in PB for main trees currently"
query_cache_28249        : Bug#43861 2009-03-25 main.query_cache_28249 fails sporadically
partition_innodb_builtin : Bug#32430 2009-09-25 mattiasj Waiting for push of Innodb changes
partition_innodb_plugin  : Bug#32430 2009-09-25 mattiasj Waiting for push of Innodb changes
innodb_bug46000          : Bug#47860 2009-10-16 satyab Test fails for innodb plugin 1.0.5
</pre></body></html>