From 797ddead2ae5f678eee182993023f524f8536d9f Mon Sep 17 00:00:00 2001
From: mistic100 <mistic@piwigo.org>
Date: Fri, 8 Apr 2011 09:09:13 +0000
Subject: bug:1791 display hd dimensions instead of websize dimensions

git-svn-id: http://piwigo.org/svn/trunk@10157 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/piwigo_structure-mysql.sql | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'install/piwigo_structure-mysql.sql')

diff --git a/install/piwigo_structure-mysql.sql b/install/piwigo_structure-mysql.sql
index 44c627b5f..31b5183ce 100644
--- a/install/piwigo_structure-mysql.sql
+++ b/install/piwigo_structure-mysql.sql
@@ -192,6 +192,8 @@ CREATE TABLE `piwigo_images` (
   `path` varchar(255) NOT NULL default '',
   `storage_category_id` smallint(5) unsigned default NULL,
   `high_filesize` mediumint(9) unsigned default NULL,
+  `high_width` smallint(9) unsigned default NULL,
+  `high_height` smallint(9) unsigned default NULL,
   `level` tinyint unsigned NOT NULL default '0',
   `md5sum` char(32) default NULL,
   `added_by` smallint(5) NOT NULL default '0',
-- 
cgit v1.2.3

