From 02111b79be58a13f83dd0751839559488c7aed57 Mon Sep 17 00:00:00 2001
From: plegall <plg@piwigo.org>
Date: Tue, 12 Jun 2012 20:51:25 +0000
Subject: feature 2632: remove useless columns and config settings at gallery
 installation

git-svn-id: http://piwigo.org/svn/trunk@15652 68402e56-0260-453c-a942-63ccdbb3a9ee
---
 install/config.sql | 14 --------------
 1 file changed, 14 deletions(-)

(limited to 'install/config.sql')

diff --git a/install/config.sql b/install/config.sql
index 9e10291c5..b88607856 100644
--- a/install/config.sql
+++ b/install/config.sql
@@ -55,20 +55,6 @@ INSERT INTO piwigo_config (param,value,comment) VALUES ('week_starts_on','monday
 INSERT INTO piwigo_config (param,value,comment) VALUES ('updates_ignored','a:3:{s:7:"plugins";a:0:{}s:6:"themes";a:0:{}s:9:"languages";a:0:{}}','Extensions ignored for update');
 INSERT INTO piwigo_config (param,value,comment) VALUES ('order_by','ORDER BY date_available DESC, file ASC, id ASC','default photo order');
 INSERT INTO piwigo_config (param,value,comment) VALUES ('order_by_inside_category','ORDER BY date_available DESC, file ASC, id ASC','default photo order inside category');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_websize_resize','false');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_websize_maxwidth','800');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_websize_maxheight','600');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_websize_quality','95');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_thumb_maxwidth','128');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_thumb_maxheight','96');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_thumb_quality','95');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_thumb_crop','false');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_thumb_follow_orientation','true');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_hd_keep','true');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_hd_resize','false');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_hd_maxwidth','2000');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_hd_maxheight','2000');
-INSERT INTO piwigo_config (param,value) VALUES ('upload_form_hd_quality','95');
 INSERT INTO piwigo_config (param,value) VALUES ('original_resize','false');
 INSERT INTO piwigo_config (param,value) VALUES ('original_resize_maxwidth','2016');
 INSERT INTO piwigo_config (param,value) VALUES ('original_resize_maxheight','2016');
-- 
cgit v1.2.3

